0 0.1 0.2

k* (GeV/c)

0.5

1

1.5

C(k*)

0-40%

= 5 fm Ω = R p Model:R

(a)

0 0.1 0.2

k* (GeV/c)

0.5

1

1.5 40-80%

= 2.5 fm Ω = R p Model:R

(b) 0.5

1

1.5 = 200 GeV NNs Au+Au ΩP+ΩP (PP) ΩP+ΩP (PP+SC) ΩP+ΩP IV IIV IIIV