1.6 1.62 1.64 1.66 1.68 1.7 1.72 1.74 )^2

M (GeV/c 0 2000

4000

6000

8000

10000

12000

)^2 count/(2 MeV/c

0-40% <2.0 GeV/c T 1.5<p Ω+Ω (a) Centrality8

1.6 1.62 1.64 1.66 1.68 1.7 1.72 1.74 )^2

M (GeV/c 0

500

1000

1500

2000

2500

3000

)^2 count/(2 MeV/c

40-80%

<2.0 GeV/c T 1.5<p Ω+Ω (c) Centrality3

1.6 1.62 1.64 1.66 1.68 1.7 1.72 1.74 )^2

M (GeV/c 0 500 1000

1500

2000

2500

3000

3500

4000

)^2 count/(2 MeV/c

0-40% <3.5 GeV/c T 3.0<p Ω+Ω (b) Centrality8

1.6 1.62 1.64 1.66 1.68 1.7 1.72 1.74 )^2

M (GeV/c 0

100

200

300

400

500

)^2 count/(2 MeV/c

40-80% <3.5 GeV/c T 3.0<p Ω+Ω (d) Centrality3