]^2

Jet Mass [GeV/c

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

Normalized Yield

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09

< 0.8 η Barrel Jet -0.8 < < 1.6 η Endcap Jet 1.3 <