Fri Mar 16 15:07:53 2018

[GeV/c] Tp 2 3 4 5 6 7 8

)^0π(_{LL}A

0.006 - 0.004 - 0.002 - 0 0.002

0.004

0.006 +X0π→

STAR pp = 510 GeV s < 3.15 η 2.65 < 30 < E < 70 GeV

[GeV/c] Tp 2 3 4 5 6 7 8

)^0π(_{LL}A

0.006 - 0.004 - 0.002 - 0 0.002

0.004

0.006

6.7% polarization scale uncertainty not shown ±

NNPDF DSSV14

< 3.90 η 3.15 < 30 < E < 100 GeV