Fri Mar 30 01:50:24 2018

]^2

[GeV/c γγM 0 0.1 0.2 0.3 0.4 0.5 0.6

Counts

2000

4000

6000

8000

10000

12000

14000

16000

18000

20000^{Data}_{Full Fit}

Signal Fit 0π Signal Fit η Background Fit

< 3.15 η 2.65 <

< 5.15 GeV/c T 4.35 < p

30 < E < 70 GeV A B C

]^2

[GeV/c γγM 0 0.1 0.2 0.3 0.4 0.5 0.6

Counts

5000

10000

15000

20000

25000

30000

35000

< 3.90 η 3.15 <

< 3.70 GeV/c T 2.95 < p 30 < E < 100 GeV

A B C