ch_Aσ / _{ch} observed A

2− 1− 0 1 2

[%] HP

0

0.5

Λ Λ = 200 GeV 20%-60% NNs STAR Au+Au <6 GeV/c T |<1, 0.5<p η|

syst.uncert. ± stat.uncert. ± slope 0.043 [%] ± 0.041 ± : 0.097 Λ 0.102 [%] ± 0.045 ± : -0.112 Λ