] ^2

[GeV/c inv M 1.11 1.12

500

1000 × STAR 30%-40%

Λ_{real}

BG (fit) BG (mix) real-BG (fit)

(a) ] ^2

[GeV/c inv M 1.11 1.12

200 400 600 800

310 × Λ

(b)