|<1 η| chn 0 10 20 30

Counts per event

4−10

2−10

1^{= 200 GeV} s p+p Minimum Bias NBD fit

> 4 GeV/c

T pψJ/ > 1.5 GeV/c

T pψJ/ > 0 GeV/c

T pψJ/