)^2

(GeV/c ee M

2.6 2.8 3 3.2 3.4

)^2 Counts / (40 MeV/c

20− 0 20 40 60 80 100 120 140_{Unlike-sign}

Like-sign Signal

MB p+p 200 GeV > 0 GeV/c Tp /NDF = 2.4 2χ = 273 ψ #J/ S/(Res.+BG) = 4.1 S/Res. = 18

)^2

(GeV/c ee M

2.6 2.8 3 3.2 3.4

)^2

Counts / (40 MeV/c

0 100 200 300 400 500 Unlike-sign Like-sign Signal

HT0 p+p 200 GeV > 1.5 GeV/c Tp /NDF = 2.3 2χ = 983 ψ #J/ S/(Res.+BG) = 8.6 S/Res. = 36

)^2

(GeV/c ee M

2.6 2.8 3 3.2 3.4

)^2

Counts / (40 MeV/c

0 100 200 300 400 500_{Unlike-sign}

Like-sign Signal

HT2 p+p 200 GeV > 4 GeV/c Tp /NDF = 1.5 2χ = 1135 ψ #J/ S/(Res.+BG) = 5.6 S/Res. = 42