< Npart >

0 100 200 300

NSC(2,4)

0 0.5 1 1.5 2_{Data}

/s =0.18) η AMPT (

Au+Au @ 200 GeV

> part < N 0 100 200 300

NSC(2,3)

0.2 − 0.1 − 0 0.1 0.2 Ideal Hydro

/s =0.08) η Viscous Hydro (