> part < N 0 100 200 300 400

NSC(2,4)

0 0.5 1 1.5 2^{39 GeV (CBW)}

200 GeV (CBW) 200 GeV (No CBW) 2.76 TeV (No CBW)

> part < N 0 100 200 300 400

NSC(2,3)

0.2 − 0.1 − 0