> part < N 0 100 200 300

> part < N × SC(2,4)

0 0.01

0.02

0.03

0.04

3−10 × 39 GeV 200 GeV HIJING (200 GeV)

> part < N 0 100 200 300

> part < N × SC(2,3)

25− 20− 15− 10− 5− 0 6−10 ×