[GeV/c] Tp 0 1 2 3 4

1v

0.04 −

0.02 −

0

0.02 = 200 GeV NNs STAR Cu+Au 10%-40%

conv

1v^{fluc}_1v {3} 1v (a)

η 1− 0.5− 0 0.5 1

1v

0.005 −

0

0.005

(ZDCE)

}^t_1Ψ{_1-v (ZDCW)

}^p_1Ψ{_1v (b)