Centrality [%]

0 20 40 60 80

1v

0.003 − 0.002 − 0.001 − 0 0.001

Cu+Au fluc Au+Au even Pb+Pb even (a)

STAR

Centrality [%]

0 20 40 60 80

〉_Tp〈/〉_xp〈

0.003 − 0.002 − 0.001 − 0 0.001 |<1 η <5 GeV/c, | T Cu+Au, Au+Au: 0.15<p |<0.8 η >0.15 GeV/c, | T Pb+Pb: p

(b)