〉 part N〈 0 100 200 300

〉_nv〈

0

0.1

0.2

=1.2 GeV/c

〉_Tp〈 Cu+Au 2v 3v 4v

STAR

Au+Au 2v 3v

(a)

〉_{part} N〈 0 100 200 300

〉_nv〈

0

0.1

0.2

0.3 =2.7 GeV/c

〉_Tp〈

PHENIX Au+Au 2v 3v 4v

(b)