[GeV/c] Tp 0 2 4

}_nΨ{_nv

0

0.1

0.2

0%-5% } TPC nΨ{_n

STAR v 2v_3v_4v -corr syst. uncert. Tp 2v_3v_4v

(a)

[GeV/c] Tp 0 2 4

}_nΨ{_nv

0

0.1

0.2

30%-40% (d) [GeV/c] _Tp

0 2 4

}_nΨ{_nv

0

0.1

0.2

10%-20% 2 PHENIX v 3 PHENIX v } BBC 2Ψ{_2

STAR v

(b)

[GeV/c] Tp 0 2 4

}_nΨ{_nv

0

0.1

0.2

40%-50% (e) [GeV/c] _Tp

0 2 4

}_nΨ{_nv

0

0.1

0.2

20%-30% =200 GeV NNs STAR Cu+Au (c)

[GeV/c] Tp 0 2 4

}_nΨ{_nv

0

0.1

0.2

50%-60% (f)