[GeV/c] Tp 0 1 2 3

1v

0.06 −

0.04 −

0.02 −

0

0.02

= 200 GeV NNs STAR Cu+Au 10%-40%

-π+^+π - +K^+K p p+ -uncorr.) T syst. uncert. (p -π+^-π_- +K^-K p p+ -corr.)

T (p π syst. uncert. of