3 H R 3 Λ

0

0.1

0.2

0.3

0.4

0.5

0.6

CERN Rep. 64-1,63(1964)

PRL20, 819(1968)

NC26, 840(1962)

NPB16, 77(1970)

NPB67, 269(1973)

NPB67, 269(1973) mean of helium bubble chamber results

STAR 2017

R.H. Dalitz, 1959 for J = 1/2 R.H. Dalitz, 1959 for J = 3/2 J.G. Congleton,1992