H lifetime(ps) 3 Λ

0 50 100 150 200 250 300 350 400 450 500

PR136,B1803(1964)

PRL20, 819(1968)

PR180,1307(1969)

NPB16, 46(1970)

PRD1, 66(1970)

NPB67, 269(1973) STAR SCIENCE 328,58(2010)

GSI NPA913, 170(2013)

ALICE PLB.754,360 (2016)

STAR 2017

(PDG) Λ free

(STAR) Λ free

R. H. Dalitz, 1962 R. H. Dalitz, 1963 M. Rayet, 1966 B. Ram, 1971 H. Mansour, 1979 J. G. Congleton, 1992 H. Kamada, 1998