(cm) τc 3 3.5 4 4.5 5 5.5

2χ

2.5 3 3.5 4 4.5 5 5.5

(b) NDF = 4

cm 0.62

0.72±

= 4.26 τc

= 4.2 2χ

= 3.2 2χ