)^2

) (GeV/c -π He+ 3(_{inv}

Mass

2.96 2.97 2.98 2.99 3 3.01 3.02 3.03

Counts

0 100 200 300 400 500 600

Au+Au Min. bias data -π He +

3→H _Λ^3 signal candidates background signal+background fit