Log(x)

3− 2.5− 2− 1.5− 1− 0.5− 0

Arbitrary Units

0 0.05 0.1 0.15

0.2 > 0η, JP2,QQ+x < 0 η , JP2, Q Q+x

< 55 GeV/c T 22.7 < p

Log(x)

3− 2.5− 2− 1.5− 1− 0.5− 0

Arbitrary Units

0 0.05 0.1 0.15 0.2 0 > 0 η , VPDMB, Gx < 0 η , VPDMB, Gx points: unbiased; histogram: triggered

< 13.8 GeV/c T 6 < p

0