0

5

10

15

20

25

2]^2

[GeV/c 2m 0 0.5 1

)π(_σn

5−

0

5

2]^2

[GeV/c 2m 0 0.5 1

Counts Per Bin

0

500

1000

1500

VPDMB Trigger < 9.9 GeV/c

T,jet

8.4 < p 0.10 < z < 0.15 ) < 2.5 π(_σ -1.5 < n Charge > 0

Pion Fit Kaon Fit Proton Fit