)π(_σn

5− 0 5

Counts Per Bin

0

5000

10000 Overall Fit

Pion Fit Kaon Fit Proton Fit Electron Fit

< 26.8 GeV/c

T,jet

22.7 < p 0.15 < z < 0.20 charge > 0