0 0.5 1 1.5

Acceptance × Efficiency

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

/ ndf

2χ 43.33 / 32 p0 0.0040 ± 0.6825 p1 0.0146 ± 0.1308 p2 1.329 ± 4.192

± ± ±

Pion

(GeV/c) Tp 0 0.5 1 1.5

Counts

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

/ ndf

2χ 39.57 / 31 p0 0.0224 ± 0.6717 p1 0.0085 ± 0.2285 p2 0.146 ± 1.192

± ± ±

Au+Au 7.7 GeV (0-5%)

Kaon

0 0.5 1 1.5

Counts

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

/ ndf

2χ 38.8 / 31 p0 0.0048 ± 0.7056 p1 0.0027 ± 0.2614 p2 0.492 ± 6.758

± ± ±

Proton