〉β〈 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

(MeV) kinT

40 60 80 100 120 140 160 180 200_{Pb+Pb 2.76 TeV}

Au+Au 200 GeV Au+Au 62.4 GeV Au+Au 39 GeV

Au+Au 27 GeV Au+Au 19.6 GeV Au+Au 11.5 GeV Au+Au 7.7 GeV