〉 _{part} N〈 0 50 100 150 200 250 300 350

(MeV) chT

100

120

140

160

180

ϕ,Ω, _S^0, K Ξ,Λ , K, p, π Ω, _S^0, K Ξ,Λ , K, p, π Ξ,Λ , K, p, π , K, p π

Au+Au 39 GeV (GCE)