1 10 100 1000

Particle Ratio

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 World data

STAR BES

+π -π Ratio:

(GeV) NNs 1 10 100 1000 0 0.2 0.4 0.6 0.8 1 1.2

+K -K Ratio:

5 10 20 100 200

-310

-210

-1 10

1

p p Ratio: