Binding energy (GeV)

0 0.2 0.4 0.6 0.8 1 1.2 1.4

AA R

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 =200 GeV NNs Au+Au =193 GeV NNs U+U 0-10%

ϒ 0-10%ϒ 0-60%

ϒ 0-60%ϒ >5 GeV/c 0-10%

T pψ J/ <6 GeV/c 0-60% T 5<p ψ J/ common norm. syst.

(1S) ϒ (2S+3S) ϒ ψJ/ STAR Quarkonia |y|<1