)^2

(GeV/c eem 8 8.5 9 9.5 10 10.5 11 11.5 12 12.5 counts

5 10 15 20 25 30 35 =193 GeV 0-60% NNs STAR U+U |y|<1

−e^+ e → (1S+2S+3S) ϒ + −N − − +N + +N combinatorial bg comb.bg.+correlated bg. ϒ comb.bg.+corr.bg.+ (3S) +bg. ϒ (2S), ϒ (1S), ϒ