(GeV/c) Tp 2 3 4 5 6 7 8 9 10

E/p∈

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

Single electron efficiency 0.75c < E/p < 1.4c cut |<1 simulations η U+U 193 GeV | ± simulated e systematic uncertainty