η 1− 0.5− 0 0.5 1

0.01 −

0.005 −

0

0.005

Cu+Au 200 GeV

<2 GeV/c T 1<p

1v

10-40%_+

h_- h syst. uncert.

+h^-h_+ syst. uncert. (EP) h

(a)

η 1− 0.5− 0 0.5 1

0.001 − 0 0.001

0.002

1vΔ

(b)