0 100 200 300 400

AA R

0 0.2 0.4 0.6 0.8 1 1.2 (a) = 200 GeV NN s Theoretical curve Total Primordial Regeneration

part N 0 100 200 300 400 0

0.2 0.4 0.6 0.8 1

1.2 = 62.4 GeV

NNs (b)

0 100 200 300 400 0 0.2 0.4 0.6 0.8 1 1.2 = 39 GeV

NNs uncertainty

coll N 200 GeV p + p uncertainty 62.4 GeV p + p uncertainty 39 GeV p + p uncertainty

(c)