part N 0 100 200 300 400

AAR

1

10

(2S) melting ψ melting cχ (2S) and ψ

(a) 200 GeV (this measurement) 200 GeV (RHIC run 10) 62.4 GeV 39 GeV NA38(19.4 GeV)/50(17.2 GeV)/60(17.2 GeV) 2.76 TeV (ALICE)

)c (GeV/ Tp 0 5 10

0-60% Au + Au

uncertainty

coll N 62.4 GeV p + p uncertainty 39 GeV p + p uncertainty

(b)