)c (GeV/ Tp 0 1 2 3

]^{-2})c dy) [(GeV/ T dp_Tpπ N/(2

2d-_e+_eB

8−10

7−10

6−10

5−10

4−10

= 39 GeV NNs

(a)

Minimum bias 10 × 0-60% 1.5 × 0-20% 20-40% 40-60%

)c (GeV/ Tp 0 1 2 3

8−10

7−10

6−10

5−10

4−10

= 62.4 GeV NNs

(b)

)c (GeV/ Tp 0 2 4

8−10

7−10

6−10

5−10

4−10

= 200 GeV

NNs

STAR published 10 × 0-60% 1.5 × 0-20% 20-40% 40-60%

(c)