)^2

(ee) (GeV/c inv M 3 3.5 0

10000

20000

30000

40000

Scaled by 2.5 (c) = 200 GeV NNs S/B = 0.04 /NDF: 98.3/48 2χ

0

10000

20000

30000

40000

unlike-sign, same event unlike-sign, mixed event like-sign, same event background subtracted MC simu. + linear function

)^2

(ee) (GeV/c inv M 3 3.5

Counts

0

50

100

150

200 (a) = 39 GeV NNs S/B = 0.62

/NDF: 29.6/23 2χ

3 3.5 0

100

200

300

400

500

0

100

200

300

400

500 (b) = 62.4 GeV NNs S/B = 0.39 /NDF: 24.5/23 2χ