10^{-1}

1

10

0 0.1 0.2 0.3 0.4

protons anti-protons

1/(2πm_t)d^2N/dm_tdy (GeV^{-2}c^4)

10^{-1}

1

10

0 0.1 0.2 0.3 0.4

m_t - m_p (GeV/c^2)

Thermal + radial flow fits