[GeV/c] Tp 0 1 2 3 4 5

]^{-2} ) [(GeV/c) T dydp Tpπ N/(2

2d_{ee}B

-8 10

-7 10

-6 10

+X, ψ J/ → d+Au

= 200 GeV NNs

(b) STAR |y|<1

PHENIX |y|<0.35