p [GeV/c]

1 1.5 2 2.5 3 3.5 4 4.5 5

Electron Efficiency and Purity

0

0.2

0.4

0.6

0.8

1

1.2

eσ dE/dx n TOF BEMC Tracking Total Purity p+p 200 GeV