2.5 3 3.5 4 0 5 10 15 20 25 30 35 40 45

2.5 3 3.5 4 0 5 10 15 20 25 30 35 40 45

- + e +e same-sign

]^2

Mass [GeV/c

2 Counts / 100 MeV/c

2 Counts / 50 MeV/c

< 4 GeV/c, |y| < 1

Tp < 3 GeV/c, |y| < 1 Tp (a) p+p 200 GeV (b) d+Au 200 GeV