[GeV/c] Tp 0 1 2 3 4 5 dAu R

0

0.5

1

1.5

2

2.5 +Xψ J/→d+Au

= 200 GeV NNs

(minimum bias)

STAR |y|<1 PHENIX |y|<0.35 EPS09 (8 mb) absσ

EPS09 +_{CollN}

p+p (syst.)

p+p (stat.)

PHENIX