c)⁄ (GeV Tp 0 1 2

2v

0.0

0.1

0.2 = 200 GeV NNs

c)⁄ (GeV Tp 1 2

2v

0.0

0.1

0.2 = 62.4 GeV NNs

c)⁄ (GeV Tp 1 2

2v

0.0

0.1

0.2 = 39 GeV NNs

c)⁄ (GeV Tp 1 2

2v

0.0

0.1

0.2 = 27 GeV NNs

0 1 2

2v

0.0

0.1

0.2 = 19.6 GeV NNs

T p 1 2

2v

0.0

0.1

0.2 = 11.5 GeV NNs

c) ⁄ (GeV 1 2

2v

0.0

0.1

0.2 = 7.7 GeV NNs

1 2

2v

0.0

0.1

0.2_+ π 0 sK p d Au+Au

Centrality: 0-80%