Z -0.4 -0.2 0.0 0.2 0.4

count (a.u.)

1000

2000

= 39 GeV, 0-80% NNs Au+Au, c)⁄ < 1.9 (GeV T 1.3 < p

Fit (sig+bkg) Signal Bkg. d

Z -0.4 -0.2 0.0 0.2 0.4

100

200

300 c)⁄ < 3.4 (GeV T 2.1 < p

t

Z -0.4 -0.2 0.0 0.2 0.4

100

200 c)⁄ < 2.5 (GeV T 1.9 < p

He^3