0.1 − 0 0.1 0.2 0.3 0.4 0.5 0.6 3−10

× =200 GeV NNs Short-range Long-range (ridge) UrQMD

|<1 η >0.2 GeV; | T all charge; p

)ηΔ({2} 2 3v

0 0.2 0.4 0.6 0.8 1 3−10 × )ηΔ({2} 2 3v

ηΔ 0 0.5 1 1.5 1− 0 1 2 3 4 3−10 × )ηΔ({2} 2 3v

=27 GeV NNs )ηΔ({2} 2 3v

)ηΔ({2} 2 3v

ηΔ 0 0.5 1 1.5

)ηΔ({2} 2 3v

=14.5 GeV NNs )ηΔ({2} 2 3v

)ηΔ({2} 2 3v

ηΔ 0 0.5 1 1.5

)ηΔ({2} 2 3v

=7.7 GeV NNs

0-5% Central

)ηΔ({2} 2 3v

20-30% Central

)ηΔ({2} 2 3v

ηΔ 0 0.5 1 1.5

60-70% Central

)ηΔ({2} 2 3v