W y -0.5 0 0.5

N A

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

0

1

ν ^+ l→ ^+W

/d.o.f. = 7.4 /6 2χ Global

KQ (assuming ‘‘sign change’’)

)^{-1} p-p 500 GeV (L = 25 pb

STAR

< 10 GeV/c W T 0.5 < P

3.4% beam pol. uncertainty not shown

W y -0.5 0 0.5

N A

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

0

1

ν ^- l→ ^-W

/d.o.f. = 19.6 /6 2χ Global

KQ (no ‘‘sign change’’)

)^{-1} p-p 500 GeV (L = 25 pb

STAR

< 10 GeV/c W T 0.5 < P

3.4% beam pol. uncertainty not shown