0.85 0.9 0.95 1 1.05 1.1 1.15

2v

0.02

0.022

0.024

0.026

0.028

0.03

1% Most Central ZDC Selection

U+U Au+Au

〉 Mult 〈 Mult/

0.85 0.9 0.95 1 1.05 1.1 1.15

2v

0.02

0.022

0.024

0.026

0.028

0.03

0.125% Most Central ZDC Selection

=0.13

hard

Glauber x Glauber Const. Quarks CGC-IPGlasma

ZDC Centrality Cut

1−10 1

310 × slope

20− 15− 10−