η/d_{ch} dN 0 200 400 600 800 1000

2ε/_2v

0

0.1

0.2

0 200 400 600 800 1000 0

0.1

0.2

Constituent Quark Glauber

U+U Au+Au

{2} 2ε/{2} 2v {4} 2ε/{4} 2v