/dy ch dN 0 200 400 600 800

/dy) ch (dN/dy)/(dN

2 4 6 8 10 12 14 16 18 6−10 × Au+Au 200 GeV 0-80% Au+Au 200 GeV Au+Au 19.6 GeV In+In 17.3 GeV

2 <0.75 GeV/c ll 0.4<M

lifetime (fm/c)

4 6 8 10 12 14 16 18 20

Th. lifetime 17.3 GeV Th. lifetime 19.6 GeV Th. lifetime 200 GeV