[GeV/c] Tp 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

{2}_2 v_{HF}e

0.1 -

0

0.1

0.2 =200 GeV

NNs,

{2}_2v

=62.4 GeV

NNs,

{2}_2v

=39 GeV

NNs,

{2}_2v He et al. 200 GeV He et al. 62.4 GeV (b)

0-60% centrality