]^2

[GeV/c eem 0 0.02 0.04 0.06 0.08 0.1 0.12 0.14

ee dN/dm

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2^310× (b) Au+Au 62.4 GeV, 0-60% centrality